Chinese| English| Site Map

Listing Documents - [Offer for Subscription] WHITE APPLICATION FORM

Author:Shinelong Date:2019-6-17 Hits:2295
Listing Documents - [Offer for Subscription] WHITE APPLICATION FORM

Kunshan factory : 90 Yangongdai Lane, Zhangpu Town, Kunshan City, Jiangsu Province
Qingdao factory : 327 Chuangye Road, Huangdao District, Qingdao City
Contact : Mr. Chen
Telephone: 0512-57452666

Email: sales@shinlone.com.cn
Copyright: Shinelong Intellectual Manufacture Precision Applied Materials (Suzhou) Company Limited.